%
\begin{isabellebody}%
\isanewline
\ \ \ \ {\isachardoublequote}prime{\isacharparenleft}p{\isacharparenright}\ {\isasymequiv}\ \isadigit{1}\ {\isacharless}\ p\ {\isasymand}\ {\isacharparenleft}m\ dvd\ p\ {\isasymlongrightarrow}\ {\isacharparenleft}m{\isacharequal}\isadigit{1}\ {\isasymor}\ m{\isacharequal}p{\isacharparenright}{\isacharparenright}{\isachardoublequote}%
\begin{isamarkuptext}%
\noindent\small
where \isa{dvd} means ``divides''.
Isabelle rejects this ``definition'' because of the extra \isa{m} on the
right-hand side, which would introduce an inconsistency (why?). What you
should have written is%
\end{isamarkuptext}%
\ {\isachardoublequote}prime{\isacharparenleft}p{\isacharparenright}\ {\isasymequiv}\ \isadigit{1}\ {\isacharless}\ p\ {\isasymand}\ {\isacharparenleft}{\isasymforall}m{\isachardot}\ m\ dvd\ p\ {\isasymlongrightarrow}\ {\isacharparenleft}m{\isacharequal}\isadigit{1}\ {\isasymor}\ m{\isacharequal}p{\isacharparenright}{\isacharparenright}{\isachardoublequote}\end{isabellebody}%
%%% Local Variables:
%%% mode: latex
%%% TeX-master: "root"
%%% End:
